X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/cbe4a5fc39533cc244a05dbd866b1cb903776863..74b03c33ff37d7363721bc2c33abb867dc9ea87c:/src/pages/_fallback.svelte?ds=sidebyside

diff --git a/src/pages/_fallback.svelte b/src/pages/_fallback.svelte
index df7da3c..7c88129 100644
--- a/src/pages/_fallback.svelte
+++ b/src/pages/_fallback.svelte
@@ -1,5 +1,5 @@
 <script>
-  import InvalidRoute from '$components/invalid_route/invalid_route.svelte';
+  import InvalidRoute from '$/components/invalid_route/invalid_route.svelte';
 </script>
 
 <InvalidRoute />
