X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/cbe4a5fc39533cc244a05dbd866b1cb903776863..74b03c33ff37d7363721bc2c33abb867dc9ea87c:/src/components/header/header.svelte

diff --git a/src/components/header/header.svelte b/src/components/header/header.svelte
index 36d4d50..ed91526 100644
--- a/src/components/header/header.svelte
+++ b/src/components/header/header.svelte
@@ -1,7 +1,7 @@
 <script>
   import { _ } from 'svelte-i18n';
 
-  import { version } from '$config/config';
+  import { version } from '$/config/config';
 </script>
 
 <header title="{$_('header.title')}">
