X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/cac85db02ff00732cf75d473dc3411332f33d845..3260d5e90a30bbf57e3e5822aa84c23cee0411be:/src/routes/__layout.svelte

diff --git a/src/routes/__layout.svelte b/src/routes/__layout.svelte
index 62881f2..0077810 100644
--- a/src/routes/__layout.svelte
+++ b/src/routes/__layout.svelte
@@ -21,10 +21,13 @@
 	<Loader />
 {:else}
 	<Header />
-	<main>
+	<main class="col-start-2 col-span-11">
 		<slot />
 	</main>
-	<nav title={$_('forum_list.title')}>
+	<nav
+		class="col-start-1 row-start-2 border-r-2 border-2-black border-solid"
+		title={$_('forum_list.title')}
+	>
 		{#if $store.loading}
 			<Loader />
 		{/if}
@@ -37,11 +40,3 @@
 	</nav>
 	<Footer />
 {/if}
-
-<style>
-	nav {
-		grid-column: col-start 1;
-		grid-row: 2;
-		border-right: 1px solid black;
-	}
-</style>
