X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/c1bc5993a694f6fd047a3881351827058042483b..a5969b7fc8bfc451da2969f06898c25eca35a4b2:/src/pages/index.svelte?ds=sidebyside

diff --git a/src/pages/index.svelte b/src/pages/index.svelte
index 7000137..b716772 100644
--- a/src/pages/index.svelte
+++ b/src/pages/index.svelte
@@ -1,6 +1,8 @@
 <script>
   import { _ } from 'svelte-i18n';
+  import Loader from '$/components/loader/loader.svelte';
 </script>
 
+<Loader />
 <h1>{$_('home.title')}</h1>
 <p>{$_('home.content')}</p>
