X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/c1bc5993a694f6fd047a3881351827058042483b..63c3da2af27fcfb1a9893ade03543e3a30949c8d:/src/pages/_fallback.svelte?ds=inline

diff --git a/src/pages/_fallback.svelte b/src/pages/_fallback.svelte
index df7da3c..7c88129 100644
--- a/src/pages/_fallback.svelte
+++ b/src/pages/_fallback.svelte
@@ -1,5 +1,5 @@
 <script>
-  import InvalidRoute from '$components/invalid_route/invalid_route.svelte';
+  import InvalidRoute from '$/components/invalid_route/invalid_route.svelte';
 </script>
 
 <InvalidRoute />
