X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6..fcbbc49687afeeecdc9388b367b1d7f2d0c76214:/src/components/invalid_route/invalid_route.svelte?ds=sidebyside

diff --git a/src/components/invalid_route/invalid_route.svelte b/src/components/invalid_route/invalid_route.svelte
index aaf7927..2a3686c 100644
--- a/src/components/invalid_route/invalid_route.svelte
+++ b/src/components/invalid_route/invalid_route.svelte
@@ -1,5 +1,5 @@
 <script>
-  import { _ } from 'svelte-i18n';
+	import { _ } from 'svelte-i18n';
 </script>
 
 <h1>{$_('error.invalid_url.title')}</h1>
