X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6..c64352ff6be4d9c05df37f02212e2e409435fc31:/src/components/glyph/glyph.svelte?ds=inline

diff --git a/src/components/glyph/glyph.svelte b/src/components/glyph/glyph.svelte
index e4b9166..98d1c6e 100644
--- a/src/components/glyph/glyph.svelte
+++ b/src/components/glyph/glyph.svelte
@@ -21,6 +21,8 @@
     height: 48px;
     margin-top: 5px;
     width: 48px;
+    background-color: white;
+    padding: 2px;
   }
 
   span {
