X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6..a5969b7fc8bfc451da2969f06898c25eca35a4b2:/src/components/header/header.svelte?ds=sidebyside

diff --git a/src/components/header/header.svelte b/src/components/header/header.svelte
index 36d4d50..ed91526 100644
--- a/src/components/header/header.svelte
+++ b/src/components/header/header.svelte
@@ -1,7 +1,7 @@
 <script>
   import { _ } from 'svelte-i18n';
 
-  import { version } from '$config/config';
+  import { version } from '$/config/config';
 </script>
 
 <header title="{$_('header.title')}">
