X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6..879fa389c2592760def75177eefbd3193e1845c9:/src/routes/%24error.svelte

diff --git a/src/routes/$error.svelte b/src/routes/$error.svelte
index df7da3c..0dd2cf6 100644
--- a/src/routes/$error.svelte
+++ b/src/routes/$error.svelte
@@ -1,5 +1,5 @@
 <script>
-  import InvalidRoute from '$components/invalid_route/invalid_route.svelte';
+	import InvalidRoute from '$/components/invalid_route/invalid_route.svelte';
 </script>
 
 <InvalidRoute />
