X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6..2a37b2ec11c46fc87dae084bc0a7659b198311aa:/src/components/home/home.svelte

diff --git a/src/components/home/home.svelte b/src/components/home/home.svelte
index 7000137..fa4a70e 100644
--- a/src/components/home/home.svelte
+++ b/src/components/home/home.svelte
@@ -1,5 +1,5 @@
 <script>
-  import { _ } from 'svelte-i18n';
+	import { _ } from 'svelte-i18n';
 </script>
 
 <h1>{$_('home.title')}</h1>
