X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/a7cf03c192470cbab13edeb1aec99e0c66dede10..d197e31bf0437889f792e013df32b868fffc35d9:/src/routes/__layout.svelte

diff --git a/src/routes/__layout.svelte b/src/routes/__layout.svelte
index b856e21..62881f2 100644
--- a/src/routes/__layout.svelte
+++ b/src/routes/__layout.svelte
@@ -1,5 +1,5 @@
-<script>
-  import "../app.css";
+<script lang="ts">
+	import '../app.css';
 	import '$lib/i18n';
 
 	import { isLoading } from 'svelte-i18n';
@@ -24,17 +24,17 @@
 	<main>
 		<slot />
 	</main>
-  <nav title={$_('forum_list.title')}>
-    {#if $store.loading}
-      <Loader />
-    {/if}
-    {#if $store.error}
-      <ErrorBlock message={$_('forum_list.error.unavailable')} />
-    {/if}
-    {#if forums}
-      <ForumList forums={forums} />
-    {/if}
-  </nav>
+	<nav title={$_('forum_list.title')}>
+		{#if $store.loading}
+			<Loader />
+		{/if}
+		{#if $store.error}
+			<ErrorBlock message={$_('forum_list.error.unavailable')} />
+		{/if}
+		{#if forums}
+			<ForumList {forums} />
+		{/if}
+	</nav>
 	<Footer />
 {/if}
 
