X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/a7cf03c192470cbab13edeb1aec99e0c66dede10..3260d5e90a30bbf57e3e5822aa84c23cee0411be:/src/routes/__error.svelte

diff --git a/src/routes/__error.svelte b/src/routes/__error.svelte
index 737fc1e..f0620d3 100644
--- a/src/routes/__error.svelte
+++ b/src/routes/__error.svelte
@@ -1,4 +1,4 @@
-<script>
+<script lang="ts">
 	import InvalidRoute from '$lib/components/invalid_route/invalid_route.svelte';
 </script>
 
