X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/8d2ed7debf232843c1facf53fd1efdab9b36d85c..24be7b5399ae4162702ad9a1f17b5711922a2da4:/app/components/invalid_route/invalid_route.svelte?ds=inline

diff --git a/app/components/invalid_route/invalid_route.svelte b/app/components/invalid_route/invalid_route.svelte
new file mode 100644
index 0000000..32225f1
--- /dev/null
+++ b/app/components/invalid_route/invalid_route.svelte
@@ -0,0 +1,2 @@
+<h1> This is not right. </h1>
+<p>This URL is not valid. Try again.</p>
