X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/862a5f9cdbbda522c608ea63c1e296e81f44de10..bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6:/src/components/invalid_route/invalid_route.svelte

diff --git a/src/components/invalid_route/invalid_route.svelte b/src/components/invalid_route/invalid_route.svelte
new file mode 100644
index 0000000..aaf7927
--- /dev/null
+++ b/src/components/invalid_route/invalid_route.svelte
@@ -0,0 +1,6 @@
+<script>
+  import { _ } from 'svelte-i18n';
+</script>
+
+<h1>{$_('error.invalid_url.title')}</h1>
+<p>{$_('error.invalid_url.message')}</p>
