X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/862a5f9cdbbda522c608ea63c1e296e81f44de10..bd8e98d7e24c4dbaee7db6ec7955f7c2f6d396a6:/app/components/invalid_route/invalid_route.svelte?ds=sidebyside

diff --git a/app/components/invalid_route/invalid_route.svelte b/app/components/invalid_route/invalid_route.svelte
deleted file mode 100644
index 32225f1..0000000
--- a/app/components/invalid_route/invalid_route.svelte
+++ /dev/null
@@ -1,2 +0,0 @@
-<h1> This is not right. </h1>
-<p>This URL is not valid. Try again.</p>
