X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/63c3da2af27fcfb1a9893ade03543e3a30949c8d..58f7d52150456713d3132408668a92d0f6f3d084:/src/components/home/home.svelte

diff --git a/src/components/home/home.svelte b/src/components/home/home.svelte
index 7000137..fa4a70e 100644
--- a/src/components/home/home.svelte
+++ b/src/components/home/home.svelte
@@ -1,5 +1,5 @@
 <script>
-  import { _ } from 'svelte-i18n';
+	import { _ } from 'svelte-i18n';
 </script>
 
 <h1>{$_('home.title')}</h1>
