X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/3841606684ee3d233266ad490905076a3562842c..862a5f9cdbbda522c608ea63c1e296e81f44de10:/app/forum.svelte

diff --git a/app/forum.svelte b/app/forum.svelte
index 85c6d12..d2a6e1b 100644
--- a/app/forum.svelte
+++ b/app/forum.svelte
@@ -1,8 +1,15 @@
 <script>
   import LightRouter from 'lightrouter';
 
+  // Initialize localization
+
+  import './config/i18n';
+
+  // Global components
+
   import ForumList from './components/forum_list/forum_list.svelte';
   import Header from './components/header/header.svelte';
+  import Footer from './components/footer/footer.svelte';
 
   // Routed Components
   import Author from './components/author/author.svelte';
@@ -47,6 +54,7 @@
   <svelte:component this={ page } params={ params } />
 </main>
 <ForumList />
+<Footer />
 
 <style>
   main {
