X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/24be7b5399ae4162702ad9a1f17b5711922a2da4..7372fe18d4fb901d3ebb86e7a73443d4dc3afb70:/app/components/post/post.svelte

diff --git a/app/components/post/post.svelte b/app/components/post/post.svelte
index 429dfd6..fad7628 100644
--- a/app/components/post/post.svelte
+++ b/app/components/post/post.svelte
@@ -19,10 +19,6 @@
 <hr/>
 
 <style>
-  article, hr, aside {
-    grid-column: col-start 2 / span 11;
-  }
-
   .post-meta > * {
     vertical-align: top;
   }
