X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/010f307346e525ac2e4239a0549d2c1a4d6d102b..d2cd7f1b4c318ac8587ab3dc1dec4a44b6d592fe:/src/routes/__error.svelte?ds=sidebyside

diff --git a/src/routes/__error.svelte b/src/routes/__error.svelte
index 0dd2cf6..f0620d3 100644
--- a/src/routes/__error.svelte
+++ b/src/routes/__error.svelte
@@ -1,5 +1,5 @@
-<script>
-	import InvalidRoute from '$/components/invalid_route/invalid_route.svelte';
+<script lang="ts">
+	import InvalidRoute from '$lib/components/invalid_route/invalid_route.svelte';
 </script>
 
 <InvalidRoute />
