X-Git-Url: https://git.r.bdr.sh/rbdr/forum/blobdiff_plain/00a6e8aa8dd06f8a2bd7ccccdccfcb6215cf4841..7372fe18d4fb901d3ebb86e7a73443d4dc3afb70:/app/forum.svelte?ds=inline

diff --git a/app/forum.svelte b/app/forum.svelte
index bb2513d..d83438d 100644
--- a/app/forum.svelte
+++ b/app/forum.svelte
@@ -1,6 +1,12 @@
 <script>
   import LightRouter from 'lightrouter';
 
+  // Initialize localization
+
+  import './config/i18n';
+
+  // Global components
+
   import ForumList from './components/forum_list/forum_list.svelte';
   import Header from './components/header/header.svelte';
 
@@ -43,5 +49,13 @@
 </script>
 
 <Header />
-<svelte:component this={ page } params={ params } />
+<main>
+  <svelte:component this={ page } params={ params } />
+</main>
 <ForumList />
+
+<style>
+  main {
+    grid-column: col-start 2 / span 11;
+  }
+</style>
