X-Git-Url: https://git.r.bdr.sh/rbdr/canvas/blobdiff_plain/c30e688113e317ff6aca8a63f16b202cbfff3820..c55cffecda48be785d89721dc8c8f04c99270b2d:/src/lib/components/sensor.svelte?ds=inline

diff --git a/src/lib/components/sensor.svelte b/src/lib/components/sensor.svelte
index e98b740..3b7dfc2 100644
--- a/src/lib/components/sensor.svelte
+++ b/src/lib/components/sensor.svelte
@@ -1,11 +1,9 @@
 <script>
   import { browser } from '$app/env';
   import { maxSize } from '$lib/config';
+  import { canvas } from '$lib/stores/canvas';
   import { sensor } from '$lib/stores/widgets';
 
-  export let x;
-  export let y;
-
   const kSensorSize = 2;
 
   let left;
@@ -23,10 +21,10 @@
 
   $: {
     if (browser) {
-      left = x - window.screen.width * kSensorSize;
-      top = y - window.screen.height * kSensorSize;
-      right = x + window.screen.width * kSensorSize;
-      bottom = y + window.screen.height * kSensorSize;
+      left = $canvas.x - window.screen.width * kSensorSize;
+      top = $canvas.y - window.screen.height * kSensorSize;
+      right = $canvas.x + window.screen.width * kSensorSize;
+      bottom = $canvas.y + window.screen.height * kSensorSize;
 
       fetchItems(left, top, right, bottom);
     }
